2.6 2.8 3 3.2 3.4 3.6 3.8 4

)^2c

(GeV/ llm 0 5 10 15 20 25 30 35 40 45 50

2c Counts per 28 MeV/

= 5.02 TeV NNs Pb − ALICE, Pb - l^+ l→ψJ/ -1bμ 7± = 233 intL

UPC, c < 0.2 GeV/ Tp | < 0.20 y| XnXn 11 ± = 84 ψJ/N

= 0.55 dof /^2χ

ALI-PUB-567103

ALI-PUB-567103